# this file is left over from the original NPB build process;
# most of its contents are no longer used
MPIF77   = 
FMPI_LIB = 
FLINK    = 
FFLAGS   = 

MPICC    = 
CMPI_LIB = 
CLINK    = 
CFLAGS   = 

CC       = $(CCOMPILE) -restrict
BINDIR   = ../bin

RAND   = 

CONVERTFLAG = 

